/*
 ps: 注意配置了多少分表就创建多少张

 Source Server         : 本地环境mysql
 Source Server Type    : MySQL
 Source Server Version : 80026
 Source Host           : localhost:3306
 Source Schema         : shard-1

 Target Server Type    : MySQL
 Target Server Version : 80026
 File Encoding         : 65001

 Date: 24/10/2021 01:42:50
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for t_order_0
-- ----------------------------
DROP TABLE IF EXISTS `t_order`;
CREATE TABLE `t_order_0` (
  `id` bigint NOT NULL AUTO_INCREMENT,
  `user_id` bigint NOT NULL,
  `order_name` varchar(255) COLLATE utf8mb4_general_ci NOT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci;

SET FOREIGN_KEY_CHECKS = 1;
